Scale chr1:

RefSeq Curated

RepeatMasker

500 kb mm39 1,100,000 1,200,000 1,300,000 1,400,000 1,500,000 1,600,000 1,700,000 1,800,000 1,900,000 Stacked Quantitative R-loop Score

Quantitative R-loop Region V2-Level-1 V2-Level-3 V2-Level-5 RLFS_RloopDB GENCODE VM38 RefSeq genes from NCBI

Repeating Elements by RepeatMasker

Quantitative Score 0 _ 0 _