Scale chr2L:

RefSeq All RefSeq Curated

RepeatMasker

50 kb dm6 110,000 120,000 130,000 140,000 150,000 160,000 170,000 180,000 190,000 RefSeq genes from NCBI

Repeating Elements by RepeatMasker