Scale chrIV:

RefSeq All RefSeq Curated

5 kb sacCer3 11,000 12,000 13,000 14,000 15,000 16,000 17,000 18,000 19,000 Stacked Quantitative R-loop Score

Quantitative R-loop Region V2-Level-1 V2-Level-3 GC-skew

AT-skew

RLFS_RloopDB RefSeq genes from NCBI

Quantitative Score 0 _ 0 _

GC-skew

0.571429 _

-0.733333 _

AT-skew

0.555556 _

-0.476923 _