Scale chr8_KZ208914v1_fix:

GENCODE V36

RefSeq Curated

DRIP-seq_HEK293

R-ChIP_HEK293T

RepeatMasker

50 kb hg38 50,000 100,000 150,000 GENCODE V36

RefSeq genes from NCBI

Level-1 Level-3 Level-5 R-loop Signal

bigwig_229_HEK293T_2HBD-Anti-GST_CUT&Tag_ChIP_NS_2_PE

bigbed_229_HEK293T_2HBD-Anti-GST_CUT&Tag_ChIP_NS_2_PE R-loop Signal

bigwig_DeepER_Human_fwd

bigbed_DeepER_Human bigwig_DeepER_Human_rev

GC-skew

AT-skew

HEK293T_Control_GRO-seq.fwd

HEK293T_Control_GRO-seq.rev

RLFS_RloopDB ChIP_BRCA1 CLIP_AQR KD_DDX5 Gene Expression in 54 tissues from GTEx RNA-seq of 17382 samples, 948 donors (V8, Aug 2019) Repeating Elements by RepeatMasker

DRIP-seq_HEK293

CUT&Tag_HEK293T

No data _

No data _

R-ChIP_HEK293T.fwd

R-ChIP_HEK293T.rev

DeepER_Human.fwd

No data _

No data _

DeepER_Human.rev

No data _

No data _

GC-skew

No data _

No data _

AT-skew

No data _

No data _

GRO-seq_HEK293T.fwd

No data _

No data _

GRO-seq_HEK293T.rev

No data _

No data _